[OMNIGRAPH.HLP  1 page]
THE LATEST VERSION OF OMNIGRAPH(July 1980) INCLUDES A GENERALIZED
TEXT DISPLAY (SEE APPENDIX H OF THE NEW OMNIGRAPH DOCUMENT, OR
PRINT THE FILE "DOC:OMNIXH.DOC".)
NEW FEATURES ALSO INCLUDE SUPPORT FOR THE TEKTRONIX 4014 AND
CROSS-HAIR INPUT FOR THE TEKTRONIX 4010 SERIES.
         OMNIGRAPH  IS  THE  PRIMARY   GRAPHICS   SOFTWARE   FOR   THE
         DECSYSTEM-10  COMPUTER  AT THE NATIONAL INSTITUTES OF HEALTH.
         THE SOURCE LANGUAGE  USING  THE  OMNIGRAPH  ROUTINES  CAN  BE
         EITHER  FORTRAN OR SAIL.   THESE ROUTINES SUPPORT A
         VARIETY OF GRAPHICS TERMINALS, INCLUDING:   DEC-340  DISPLAY,
         COMPUTEK  400,  ADAGE AGT-30, TEKTRONIX 4010,4014, AND DEC GT40.
         THE  ACCOMPANYING  ROUTINES  PLOTX  AND  OMPLOT  ALSO   ALLOW
         OFF-LINE  PLOTTING AND THE DISPLAY OF OFF-LINE PLOTS TO CHECK
         FOR ERRORS BEFORE PLOTTING OFF-LINE.

         DOCUMENTATION:OMNIGRAPH DISPLAY MANUAL
        (approx. $7.00 from Locke Computer Office)

.KJOB
.
