[HELP HPPLOT  1 page]

Plotting on the HP 7221 may be done by running GRF:TEKHPL.  It converts
a .TEK file to one that can be copied to the HP7221 using TYPFIL.
The commands currently are:

        .R GRF:TEKHPL
        (answer prompts)
        .R TYPFIL
        TTY572:=filename.hpl

[Now for something completely different - an older style plotter]
Plotting on the HEWLETT-PACKARD 7200 series PLOTTER may be accomplished
by using the TEKTRONIX PLOT-10 package software along with a special
output subroutine named TEKHP, residing on SYS: .
It supports all vector and point drawing, without the characters
available in the TEKTRONIX ALPHA-MODE.  It is worth noting,
though, that PLOT-10 has a character-generator
in software which could be used for text on the HP.  Also,
the PLOT-10 CALCOMP PREVIEW PACKAGE may be used for text, by calling
the CALCOMP routine "symbol".


To load your PLOT10 program(e.g. PROG1.FOR) for use
on the H.P. PLOTTER, type:

LOAD PROG1,SYS:TEKHP,SYS:TEK/LIB

        The SYS:TEKHP routine is the addition to the
        command which causes H.P.PLOT operation rather than
        TEKTRONIX opperation.  If the ADVANCED-
        GRAPH library is also needed, for example, type

LOAD PROG1,SYS:TEKHP,SYS:AG/LIB,SYS:TEK/LIB

To load your CALCOMP program for use on the HP-PLOTTER, type

LOAD PROG1,SYS:TEKHP,SYS:TEKPRE/LIB,SYS:TEK/LIB  .

[SEE "HELP TEK" FOR PLOT-10 INFORMATION]

[End of HELP HPPLOT]

.KJOB
.
