[HLP:AJ.HLP  1 page]

        GRAPHICS SUPPORT OF ANDERSON_JACOBSON 830/832 terminals

        To load a program for use with the AJ software, type:

                LOAD PROG,DSKD:AJSUB[24,45]

where your FORTRAN program is named  "PROG". This routine
causes printing of the plot on the terminal, regardless of the device
for output stated in the CALL PLOTS call.  This should probably be
changed someday, but for now, it seems to be the way that works.

File AJSUB is a collection of the .REL files from AJ.FOR and AJOUTP.MAC .
AJOUTP.MAC is the MACRO subroutine which does the actual terminal output
of the left-adjusted character in the word used as the argument in AJOUTP.

in case of difficulty contact Gerard Pence (3-9275)

[end of AJ.HLP]

.KJOB
.
